[Entry]
Entry_Name=CIX Internet
ISP=CIX Internet

[Internet_Mail]
Use_IMAP=No
SMTP_Server=mail.cix.co.uk
POP_Server=mail.cix.co.uk
Default_Client=No
Logon_Using_SPA=No
Install_Mail_16=0

[URL]
Home_Page=http://www.cix.co.uk
Help_Page=http://www.cix.co.uk/supportf.html
NoWelcome=1
FirstHomePage=

[Proxy]
HTTP_Proxy_Server=www.cix.co.uk:8000
FTP_Proxy_Server=
Gopher_Proxy_Server=
Secure_Proxy_Server=
Socks_Proxy_Server=
Use_Same_Proxy=0
Proxy_Override=<local>;;cix.co.uk;compulink.co.uk;cix.net.uk
Proxy_Enable=1

[Phone]
Phone_Number=3555222
Area_Code=0845
Country_Code=44
Country_ID=44
Dial_As_Is=No

[User]
Requires_Logon=Yes

[Server]
SW_Compress=No
PW_Encrypt=No
Type=PPP
Negotiate_TCP/IP=Yes

[Scripting]
Path32=
Name32=

[TCP/IP]
Specify_Server_Address=No
IP_Header_Compress=Yes
Gateway_On_Remote=Yes
DNS_Address=194.153.0.18
DNS_Alt_Address=194.153.1.10

[Internet_News]
NNTP_Server=news.cix.co.uk
Default_Client=No
Logon_Using_SPA=No
Logon_Required=0

[Alternate_Numbers]
1=0845, 079 5222, Local Rate (Energis)
2=0845, 355 5222, Local Rate (COLT)
3=020, 255 5255, London (Telewest)
4=0845, 079 8776, Local Rate (Energis)



